%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Adar+Kuells2002} Adar, E. M., \& K{\"u}lls, C. (2002). \textit{MCM sf{\textendash}Mixing-cell model for a steady flow MIG{\textendash}Mixing-cell input generator: A short manual for installation and operation of MCM sf using the MIG{\textendash}mixing-cell input generator}.

\end{thebibliography}

\end{document}

